Presidents Ford, Reagan, Carter, Nixon and Clinton were on the
Titanic,
on that fateful night the ship hit an iceberg and began to sink...
Ford screamed, "What should we do?"
Reagan said, "Man the lifeboats."
Carter said, "Women and children first."
Nixon said, "Screw the women and children."
Clinton said, "Do you think we have time?"